0.9 0.95 1

-0.1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08 0.1

Real Part

Imaginary Part

Pitch/Depth Root Locus on Actuator Gain atδ_E

Roots Begin Nominal End Open Loop Zeros