4992 5056 5120 5184 5248 5312 5376 5440 5504

Sinusoid λ = 25.6 from 0 to 10239

10^{-18}

10^{-16}

10^{-14}

10^{-12}

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

10^2 2 5 10 20 50 100 200