{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ORDER","type":"number","width":2,"decimals":0},{"name":"SYMBOL","type":"character","width":6},{"name":"NAME","type":"character","width":15},{"name":"DESC","type":"character","width":22},{"name":"EQUATION","type":"character","width":65},{"name":"MODIFIABLE","type":"logical","width":1},{"name":"ROUND","type":"number","width":1,"decimals":0},{"name":"MEASURE","type":"character","width":6},{"name":"SCALE","type":"character","width":3},{"name":"DECIMALS","type":"number","width":1,"decimals":0},{"name":"VALUE","type":"number","width":17,"decimals":4},{"name":"WINDOW","type":"number","width":1,"decimals":0},{"name":"ROW","type":"number","width":2,"decimals":0},{"name":"COL","type":"number","width":2,"decimals":0},{"name":"PALLETTE","type":"character","width":7},{"name":"WIN_DESC","type":"character","width":25}],"n_rows":28,"rows_kept":28,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,"\u009f","frequency","Frequency","30.0000/wavelength",true,4,null,"GHz",2,6.5000,1,2,2,"RED","TRANSMITTER CALCULATIONS"]
[2,"lambda","wavelength","Wavelength","30.0000/frequency",true,4,"length","in.",4,4.6154,1,3,2,"RED",null]
[4,"R","range","Range","(wavelength/(4*pi))*10^(attenuation/20)",true,4,"length","mi.",1,9654000.0000,1,5,2,"RED",null]
[3,"L(R)","attenuation","Free space attenuation","20*log10(4*pi*range/wavelength)",true,2,null,"dB",1,148.4000,1,6,2,"RED",null]
[5,"D","diameter","Antenna diameter","(10^(gain/10)/efficiency)^.5*wavelength/pi",true,4,"length","ft.",1,121.9406,1,8,2,"RED",null]
[6,"NF","near_field","Near field limit","diameter^2/wavelength",false,4,"length","yd.",0,3221.7164,1,9,2,"RED",null]
[7,"FF","far_field","Far field limit","2*near_field",false,4,"length","yd.",0,6443.4328,1,10,2,"RED",null]
[8,"î","surface","Surface tolerance","wavelength*log(10^(gain_reduction/10))^.5/(4*pi)",true,4,"length","in.",4,0.0625,1,11,2,"RED",null]
[9,"GR","gain_reduction","Gain reduction","10*log10(exp((-4*pi*surface/wavelength)^2))",true,4,null,"dB",2,0.1258,1,12,2,"RED",null]
[10,"BWe3","BWe3","3dB E-plane beam width","32.5*(2*wavelength/diameter)",false,4,null,"ø",2,2.4602,1,13,2,"RED",null]
[11,"BWh3","BWh3","3dB H-plane beam width","37.0*(2*wavelength/diameter)",false,4,null,"ø",2,2.8009,1,14,2,"RED",null]
[12,"BWh1","BWh1","1dB E-plane beam width","bwe3 / 3^.5",false,4,null,"ø",2,1.4204,1,15,2,"RED",null]
[13,"BWe1","BWe1","1dB H-plane beam width","bwh3 / 3^.5",false,4,null,"ø",2,1.6171,1,16,2,"RED",null]
[14,"E","efficiency","Efficiency",null,true,4,null,"%",0,0.6536,1,17,2,"RED",null]
[15,"G","gain","Gain","10*.4343*log((pi*diameter/wavelength)^2*efficiency)",true,4,null,"dB",4,36.5354,1,18,2,"RED",null]
[17,"PtdBm","tpower","Transmitter power","erp-gain",true,4,"w","W",1,30.0004,2,2,39,"RED",null]
[16,"ERPdbm","erp","Effec. radiated power","tpower+gain",true,4,"w","dBm",0,66.5358,2,3,39,"RED",null]
[19,"B","noise_bw","Noise bandwidth","10^((noise_inp+198.6)/10)/sys_temp",true,4,"hz","MHz",3,200830.6528,3,7,43,"BLUE","RECEIVER CALCULATIONS"]
[20,"Tsys","sys_temp","System noise temp.","10^((noise_inp+198.6)/10)/noise_bw",true,4,"temp","øK",0,100.0000,3,8,43,"BLUE",null]
[18,"Pn","noise_inp","Effective noise input","-198.6+10*.4343*log(sys_temp*noise_bw)",true,4,"w","dBm",0,-125.5717,3,9,43,"BLUE",null]
[21,"Il","rf_loss","R.F. insertion loss","abs(10*.4343*log(power_coeff))",true,4,null,"dB",1,1.0002,3,11,43,"BLUE",null]
[22,"à","power_coeff","Pwr trans. coefficient","10^(-1*rf_loss/10)",true,4,null,null,2,0.7943,3,12,43,"BLUE",null]
[24,"To","rf_temp","Temp. of RF lines","eff_noise/(1-power_coeff)",true,4,"temp","øK",0,290.0000,3,13,43,"BLUE",null]
[23,"Teff","eff_noise","Eff.noise contribution","rf_temp*(1-power_coeff)",true,4,"temp","øK",0,59.6530,3,14,43,"BLUE",null]
[26,"NFm","m_noise_figure","Noise figure stage M","10*.4343*log(m_eff_noise/290+1)",true,4,null,"dB",1,10.5488,3,16,43,"BLUE",null]
[25,"Tm","m_eff_noise","Effec.noise contrib.-M","290*(10^(m_noise_figure/10)-1)",true,4,"temp","øK",0,3000.5462,3,17,43,"BLUE",null]
[28,"GdB","m_gain_pre","Gain preceding stage M","10*.4343*log(m_eff_noise/m_noise_temp-1)",true,4,null,"dB",4,29.9720,3,18,43,"BLUE",null]
[27,"Tmc","m_noise_temp","Noise contrib. stage M","m_eff_noise/10^(m_gain_pre/10)",true,4,"temp","øK",4,3.0172,3,19,43,"BLUE",null]