-9 -8 -7 -6 -5 -4 -3 -2 -1 0 x 10^{-3} -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 x 10^{-3} Gain Adj Data: LBL200rpm1.csv

Time (sec)

Volts

EXP 8: Set 3 dt: Orig=1e-006, Adj=1e-006 N: Orig=1000, Adj=10000

dt (sec) = 1e-006 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 x 10^5

-180

-170

-160

-150

-140

-130

-120

Uncal Avg Spect Mag: 10 File Avg

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 100.01

-9 -8 -7 -6 -5 -4 -3 -2 -1 0 x 10^{-3} -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 x 10^8 Gain/WIn/Cal Adj Data: LBL200rpm1.csv

Time (sec)

Pressure (uPa)

Max=9.3512e+007 uPa

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 x 10^5 40

50

60

70

80

90

100 Calib Avg Spect Mag: 10 File Avg

Frequency (Hz)

(dB re: uPa)

Max (dB) = 93.3203

-4.48 -4.46 -4.44 -4.42 -4.4 -4.38 -4.36 -4.34 -4.32 -4.3 x 10^{-3} -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 x 10^8 Gain/WIn/Cal Adj Data: LBL200rpm1.csv

Time (sec)

0 1 2 3 4 5 x 10^4 40

50

60

70

80

90

100 Calib Avg Spect Mag: 10 File Avg

Frequency (Hz)

Max (dB) = 87.5186