0.007 0.008 0.009 0.01 0.011 0.012 0.013 0.014 0.015 0.016

-0.02

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

0.02

Gain Adj Data: DATA 20

Time (sec)

Volts

DATA 20 Set 1 dt: Orig=1e-006, Adj=1e-006 N: Orig=9998, Adj=10000

dt (sec) = 1e-006 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 100.01

0.007 0.008 0.009 0.01 0.011 0.012 0.013 0.014 0.015 0.016 -4 -3 -2 -1 0 1 2 3 4 x 10 7 Gain/Win/Cal Adj Data: DATA 20

Time (sec)

Pressure (uPa)

Max=2.407e+007 uPa

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 116.2189

9.1 9.2 9.3 9.4 9.5 9.6 9.7 9.8 9.9 10 x 10 -3 -4 -3 -2 -1 0 1 2 3 4 x 10 7 Gain/Win/Cal Adj Data: DATA 20

Time (sec)

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 86.3862