1.064 1.066 1.068 1.07 1.072 1.074 1.076 1.078 1.08 1.082 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 x 10 -3 Gain Adj Data: DATA 30

Time (sec)

Volts

DATA 30 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=10000, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-190

-180

-170

-160

-150

-140

-130

-120

-110

-100

Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

1.064 1.066 1.068 1.07 1.072 1.074 1.076 1.078 1.08 1.082 -1

-0.5

0

0.5

1

1.5 x 10 7 Gain/Win/Cal Adj Data: DATA 30

Time (sec)

Pressure (uPa)

Max=1.4562e+007 uPa

0 0.5 1 1.5 2 x 10 5 0 10 20 30 40 50 60 70 80 90 100 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 82.7987

1.0654 1.0656 1.0658 1.066 1.0662 1.0664 1.0666 1.0668 1.067 1.0672 -1

-0.5

0

0.5

1

1.5 x 10 7 Gain/Win/Cal Adj Data: DATA 30

Time (sec)

0.5 1 1.5 2 2.5 x 10 4 0 10 20 30 40 50 60 70 80 90 100 Cal Spect Mag

Frequency (Hz)

Max (dB) = 74.4289