1.102 1.104 1.106 1.108 1.11 1.112 1.114 1.116 1.118 1.12

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

Gain Adj Data: DATA 38

Time (sec)

Volts

DATA 38 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=10000, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

1.102 1.104 1.106 1.108 1.11 1.112 1.114 1.116 1.118 1.12 -5 -4 -3 -2 -1 0 1 2 3 4 5 x 10 7 Gain/Win/Cal Adj Data: DATA 38

Time (sec)

Pressure (uPa)

Max=4.7554e+007 uPa

0 0.5 1 1.5 2 x 10 5 20 30 40 50 60 70 80 90 100 110 120 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 118.9557

1.104 1.1042 1.1044 1.1046 1.1048 1.105 1.1052 1.1054 1.1056 1.1058 1.106 -5 -4 -3 -2 -1 0 1 2 3 4 5 x 10 7 Gain/Win/Cal Adj Data: DATA 38

Time (sec)

0.5 1 1.5 2 2.5 x 10 5 20 30 40 50 60 70 80 90 100 110 120 Cal Spect Mag

Frequency (Hz)

Max (dB) = 99.696