3.8 4 4.2 4.4 4.6 4.8 5 5.2 5.4 5.6

-200

-198

-196

-194

-192

-190

-188

-186

-184

-182

-180

Raw Calibration Data

Freq (Log(Hz)) dB re: 1V/uPa

RESONTC4014SN0202101

0 1 2 3 4 5 x 10 5 -200

-198

-196

-194

-192

-190

-188

-186

-184

-182

-180

Zero Extended Calib Data

Freq (Hz)

0 0.5 1 1.5 2 x 10 5 -200

-198

-196

-194

-192

-190

-188

-186

-184

-182

-180

Resampled Calibration Data

Freq (Hz)

0 0.5 1 1.5 2 x 10 5 1.6

1.8

2

2.2

2.4

2.6

2.8

3 x 10 9 Resampled Calibration Data

Freq (Hz) uPa/Volt