0.71 0.712 0.714 0.716 0.718 0.72 0.722 0.724 0.726 0.728

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

Gain Adj Data: DATA 49

Time (sec)

Volts

DATA 49 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=9998, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

0.71 0.712 0.714 0.716 0.718 0.72 0.722 0.724 0.726 0.728 -10

-5

0

5 x 10 7 Gain/Win/Cal Adj Data: DATA 49

Time (sec)

Pressure (uPa)

Max=3.5731e+007 uPa

0 0.5 1 1.5 2 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 122.3492

0.709 0.7092 0.7094 0.7096 0.7098 0.71 0.7102 0.7104 0.7106 0.7108 -10

-5

0

5 x 10 7 Gain/Win/Cal Adj Data: DATA 49

Time (sec)

0.5 1 1.5 2 2.5 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 78.4543