0.8 0.802 0.804 0.806 0.808 0.81 0.812 0.814 0.816 0.818

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

Gain Adj Data: DATA 51

Time (sec)

Volts

DATA 51 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=9998, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

0.8 0.802 0.804 0.806 0.808 0.81 0.812 0.814 0.816 0.818 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 x 10 7 Gain/Win/Cal Adj Data: DATA 51

Time (sec)

Pressure (uPa)

Max=1.3245e+007 uPa

0 0.5 1 1.5 2 x 10 5 -50

0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 105.9877

0.8138 0.814 0.8142 0.8144 0.8146 0.8148 0.815 0.8152 0.8154 0.8156 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 x 10 7 Gain/Win/Cal Adj Data: DATA 51

Time (sec)

0.5 1 1.5 2 2.5 x 10 5 -50

0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 79.3528