0.766 0.768 0.77 0.772 0.774 0.776 0.778 0.78 0.782 0.784

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 Gain Adj Data: DATA 52

Time (sec)

Volts

DATA 52 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=9998, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

0.766 0.768 0.77 0.772 0.774 0.776 0.778 0.78 0.782 0.784 -5 -4 -3 -2 -1 0 1 2 3 4 5 x 10 9 Gain/Win/Cal Adj Data: DATA 52

Time (sec)

Pressure (uPa)

Max=4.1395e+009 uPa

0 0.5 1 1.5 2 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 138.3643

0.767 0.7672 0.7674 0.7676 0.7678 0.768 0.7682 0.7684 0.7686 0.7688 -5 -4 -3 -2 -1 0 1 2 3 4 5 x 10 9 Gain/Win/Cal Adj Data: DATA 52

Time (sec)

0.5 1 1.5 2 2.5 x 10 4 0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 124.8698