0.5 0.502 0.504 0.506 0.508 0.51 0.512 0.514 0.516 0.518

-0.1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08 0.1 Gain Adj Data: DATA 55

Time (sec)

Volts

DATA 55 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=9998, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

0.5 0.502 0.504 0.506 0.508 0.51 0.512 0.514 0.516 0.518 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 x 10 8 Gain/Win/Cal Adj Data: DATA 55

Time (sec)

Pressure (uPa)

Max=1.9867e+008 uPa

0 0.5 1 1.5 2 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 125.7889

0.5058 0.506 0.5062 0.5064 0.5066 0.5068 0.507 0.5072 0.5074 0.5076 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 x 10 8 Gain/Win/Cal Adj Data: DATA 55

Time (sec)

0.5 1 1.5 2 2.5 x 10 4 0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 125.7889