0.33 0.332 0.334 0.336 0.338 0.34 0.342 0.344 0.346 0.348

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 Gain Adj Data: DATA 56

Time (sec)

Volts

DATA 56 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=9998, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

0.33 0.332 0.334 0.336 0.338 0.34 0.342 0.344 0.346 0.348 -5 -4 -3 -2 -1 0 1 2 3 4 5 x 10 8 Gain/Win/Cal Adj Data: DATA 56

Time (sec)

Pressure (uPa)

Max=4.9057e+008 uPa

0 0.5 1 1.5 2 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 130.3939

0.3348 0.335 0.3352 0.3354 0.3356 0.3358 0.336 0.3362 0.3364 0.3366 -5 -4 -3 -2 -1 0 1 2 3 4 5 x 10 8 Gain/Win/Cal Adj Data: DATA 56

Time (sec)

0.5 1 1.5 2 2.5 x 10 4 0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 130.3939