0.646 0.648 0.65 0.652 0.654 0.656 0.658 0.66 0.662 0.664

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 Gain Adj Data: DATA 58

Time (sec)

Volts

DATA 58 Set 1 dt: Orig=2e-006, Adj=2e-006 N: Orig=9998, Adj=10000

dt (sec) = 2e-006 0 0.5 1 1.5 2 x 10 5 -200

-150

-100

-50 Uncal Spect Mag

Frequency (Hz)

(dB re: 1 Volt) df (Hz)= 50.005

0.646 0.648 0.65 0.652 0.654 0.656 0.658 0.66 0.662 0.664 -4 -3 -2 -1 0 1 2 3 4 x 10 8 Gain/Win/Cal Adj Data: DATA 58

Time (sec)

Pressure (uPa)

Max=3.7942e+008 uPa

0 0.5 1 1.5 2 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

(dB re: uPa)

Max (dB) = 129.7488

0.6526 0.6528 0.653 0.6532 0.6534 0.6536 0.6538 0.654 0.6542 0.6544 -4 -3 -2 -1 0 1 2 3 4 x 10 8 Gain/Win/Cal Adj Data: DATA 58

Time (sec)

0.5 1 1.5 2 2.5 x 10 5 0

50

100

150 Cal Spect Mag

Frequency (Hz)

Max (dB) = 129.7488