-1400 -1200 -1000 -800 -600 -400 -200 0 200 0 100 200 300 400 500 600 700 800

Initial UTM Coord North = 4072256.18 East = 603231.59 Dead Reckoning-Blue; GPS-Magenta; Sim-Green Lbl filter-Cyan; Lbl fix-Black ; Data Set: F:\Jun01_Buoy\2001.176.10

Relative UTM East, Meters

Relative UTM North, Meters