0 200 400 600 800 1000 1200 1400 0 2 4 6 8 10 12

Amps

Elapsed Time (s)

Thruster Current 1 ; Data Set: F:\Jun01_Buoy\2001.176.10 15-Jul-2003 15:48:10

0 200 400 600 800 1000 1200 1400 0 50 100 150 200 250 300 350

Rev/Min

Propeller Speed ; Data Set: F:\Jun01_Buoy\2001.176.10 15-Jul-2003 15:48:10

Elapsed Time (s)