0 200 400 600 800 1000 1200 1400 -40 -30 -20 -10 0 10 20

Degrees

Rudder Angle ; Data Set: F:\Jun01_Buoy\2001.176.10 15-Jul-2003 15:48:10

Elapsed Time (s)

0 200 400 600 800 1000 1200 1400

-15 -10 -5 0 5 10

Elevator Angle ; Data Set: F:\Jun01_Buoy\2001.176.10 15-Jul-2003 15:48:10

Elapsed Time (s)