0 20 40 60 80 100 120 0 10 20 30 40 50 60 70

Deg

Heading, Case:ClosedLoop RSM 05-Oct-1999 16:38:51

0 20 40 60 80 100 120 -6 -4 -2 0 2 4 Cross-Track Error, Case:ClosedLoop RSM 05-Oct-1999 16:38:51

Meters

Seconds