0 20 40 60 80 100 120

-200

-150

-100

-50

0

50

100

Seconds

Newton-Meters

Moments about CG and Tailcone Pivot Point, Case:ClosedLoop RSM 05-Oct-1999 16:38:51 Torque About Veh CG Torque About Pivot Pt