0 10 20 30 40 50 60 70 80 0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

Current Speed (cm/s)

Energy per 100 meter round trip (W-Hr)

5 cm/s 10 cm/s 15 cm/s 20 cm/s 25 cm/s