(b) Vectran High-Modulus EOM cable w/ snubber

Buoy

Anchor 0.5

1.0

1.5

2.0

2.5

3.0

3.5

4.0

4.5 x 10^4

0 20 40 60 80 100 120

Total Tension (N)

Time (s)