0 500 1000 1500 2000 2500 3000 3500 0 500 1000

1500

2000

2500

Time (seconds)

Tension (lbs)

H_s = 5.0m (13.5s) Tensions Measured below Buoy on 11/04/2004

0 20 40 60 80 100 120 140 160 180 0 500 1000

1500

2000

2500

Time (seconds)

H_s = 5.0m (13.5s) Measured on Deployed Buoy Model Prediction