Copyright: Monday, July 09, 2001 08:16:05


Click to select the Turn off System Restore on all drives.


Click drive to change its System Restore monitoring status.


Click Settings to change the selected drive’s settings.


Click OK to confirm the change.


Click Cancel to close the dialog box without making changes.


Click to select the Turn off System Restore on this drive.