1400

1600

1800

2000

2200

1200 1400 1600 1800 2000 2200

Counts / Raman Shift (cm-1) Overlay Y-Zoom CURSOR File # 1 = 08223053 8/22/02 1:48 PM Res=None Ventana dive 2231 -- gas box experiment #4 -- 50/50 gas mixture (5 x 5 sec)

Files 08223053 and 08223060 to 08223100 by 10, 200 m (5 x 5 sec)