4500

5000

5500

6000

6500

7000

7500

800 1000 1200 1400 1600 1800

Counts / Raman Shift (cm-1) Overlay Y-Zoom CURSOR File # 3 = 08230006 8/23/02 11:39 AM Res=None Ventana dive 2233 -- gas experiment #1 (50/50 mixture) -- 10 x 15 sec (seawater) None X=None Width=None Area=None Qty=None

08223017 -- Dive #2232, 300 m (5 x 5 sec)x3

08223051 -- Dive #2232, 200 m (5 x 5 sec)x3

08231001 -- Dive #2234, 400 m (10 x 15 sec)

08230006 -- Dive #2333, 400 m (10 x 15 sec)