0

1000

2000

3000

4000

5000

600 800 1000 1200 1400 1600 1800 2000

Counts / Raman Shift (cm-1) Overlay Y-Zoom CURSOR File # 1 = 04300090 4/30/02 10:33 AM Res=None TD#420, (5 x 5 sec), Bottom, ~3607m, CO2

Liquid CO2 (3607 m depth), TD420 (4/30/02)