NE2000 Compatible PCMCIA Adapters Setup

Use this dialog box to configure settings for the 	Accton EN2216 PCMCIA Adapter

D-Link DE-650 PCMCIA Adapter

LinkSys EC2T PCMCIA Adapter

IRQ Level

Select an interrupt level for his adapter. Do not set this to IRQ3 if you have two COM ports   COM1=IRQ4 and COM2=IRQ3).

I/O Port Address

Select a number (expressed as a hexadecimal string) to specify the I/O port base address.

Note: These adapters require NT 3.51 PCMCIA card and socket services to work.