Main Index
Network Peripherals FDDI AT Adapters (AT1, AT2, AT3)

Interrupt Number

It defines the interrupt request line that the adapter will use to interrupt the system.

Interrupts supported for AT1 and AT2 are 10 and 11.

Interrupts supported for AT3 are 9, 10, 11 and 15.

I/O Port Base Addr

It defines the I/O port base address that the adapter will use. The selected value must match the actual switch settings in on the adapter.

I/O ports supported are 0x160, 0x180, 0x260, 0x280, 0x360, 0x380.