Copyright: Copyright © Sealevel Systems, Inc.


Contents

SeaCom includes some sample applications that may help you get started with serial communications.  They can be found in the SamplesUtilities subdirectory of your SeaCOM installation.  ( The default is c:\Program Files\SeaCOM\SamplesUtilities)

Modemctr:  Modem Control shows the basics of using the electrical signals available, such as RTS and DTR.

Terminal:  A standard terminal Windows application.

Uarttst:  Various tests of the UART's functions.