Immersion Optic Depth of Focus in Water

0

1 0 0 0 0

2 0 0 0 0

3 0 0 0 0

4 0 0 0 0

5 0 0 0 0

6 0 0 0 0

7 0 0 0 0

8 0 0 0 0

9 0 0 0 0

- 0 . 8 0 - 0 . 7 0 - 0 . 6 0 - 0 . 5 0 - 0 . 4 0 - 0 . 3 0 - 0 . 2 0 - 0 . 1 0 0 . 0 0 0 . 1 0 0 . 2 0 0 . 3 0 0 . 4 0 0 . 5 0 0 . 6 0 0 . 7 0 0 . 8 0

D i s t a n c e f r o m f o c a l p o i n t ( m m )

520 cm-1 peak area