Methane Peak Position vs. Depth

y = - 0 . 0 0 3 1 x + 2 9 1 9 . 3

R 2 = 0 . 9 9 4 9

2 9 1 4

2 9 1 5

2 9 1 5

2 9 1 6

2 9 1 6

2 9 1 7

2 9 1 7

2 9 1 8

2 9 1 8

2 9 1 9

2 9 1 9

0 2 0 0 4 0 0 6 0 0 8 0 0 1 0 0 0 1 2 0 0 1 4 0 0 1 6 0 0

D e p t h ( m )

Peak Position (cm-1)