0 5 10 15 20 25

20.5 21 21.5 22 22.5

Volts

Metrabyte Voltage ; Data Set: 2001.185.13 Plotted on 01-Aug-2001 14:49:15

0 5 10 15 20 25 0

0.01

0.02

0.03

Amperes

Metrabyte Current ; Data Set: 2001.185.13 Plotted on 01-Aug-2001 14:49:15

0 5 10 15 20 25 -4 -2 0 2 4

Watts

Metrabyte Power ; Data Set: 2001.185.13 Plotted on 01-Aug-2001 14:49:15

Elapsed Time (s)

Total Propulsion Hotel