125 130 135 140 145 150 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

Amps

Pump Currents and Temperatures ; Data Set: 2001.185.13 Plotted on 01-Aug-2001 14:58:44

Anolyte A Anolyte B Catholyte Peroxide

125 130 135 140 145 150 0

10

20

30

40

Centigrade

Elapsed Time (s)

Anolyte Catholyte Fwd Peroxide Aft Peroxide