0 1 2 3 4 5 6

-3.5

-3

-2.5

-2

-1.5

-1

-0.5

0

Initial UTM Coord North = 4071784.94 East = 605269.95 Dead Reckoning-Blue; GPS-Magenta; Sim-Green Lbl filter-Cyan; Lbl fix-Black ; Data Set: 2001.185.13

Relative UTM East, Meters

Relative UTM North, Meters