0 100 200 300 400 500 600 700 800 900 15 20 25 30 35

Volts

Metrabyte Voltage ; Data Set: 2001.185.14 Plotted on 01-Aug-2001 12:37:50

0 100 200 300 400 500 600 700 800 900 0

0.01

0.02

0.03

Amperes

Metrabyte Current ; Data Set: 2001.185.14 Plotted on 01-Aug-2001 12:37:50

0 100 200 300 400 500 600 700 800 900

-400

-200 0 200 400

Watts

Metrabyte Power ; Data Set: 2001.185.14 Plotted on 01-Aug-2001 12:37:50

Elapsed Time (s)

Total Propulsion Hotel