5500 5520 5540 5560 5580 5600 5620 5640 5660 5680 5700 0

0.5

1

1.5

Amps

Pump Currents and Temperatures ; Data Set: Winfrog Plotted on 13-Jul-2001 11:14:57

Anolyte A Anolyte B Catholyte Peroxide

5500 5520 5540 5560 5580 5600 5620 5640 5660 5680 5700 -10 -5 0 5 10 15 20 25

Centigrade

Elapsed Time (s)

Anolyte Catholyte Fwd Peroxide Aft Peroxide