5500 5520 5540 5560 5580 5600 5620 5640 5660 5680 5700 -1

-0.5

0

0.5

1

Health Flags

Health and Status ; Data Set: Winfrog Plotted on 13-Jul-2001 11:14:57

5500 5520 5540 5560 5580 5600 5620 5640 5660 5680 5700 3

3.5

4

4.5

5

Status Count

Elapsed Time (s)