0 100 200 300 400 500 600 700 800 900 1000 -2 0 2

Body X

Dvl Measurement; Blue is wrto Bottom ; Data Set: Winfrog Plotted on 13-Jul-2001 11:15:6

0 100 200 300 400 500 600 700 800 900 1000 -1 0 1

Body Y

0 100 200 300 400 500 600 700 800 900 1000 -1 0 1

Body Z

0 100 200 300 400 500 600 700 800 900 1000 0 1 2

|Vel|

0 100 200 300 400 500 600 700 800 900 1000 0 100 200

Bot & Wat Stat

0 100 200 300 400 500 600 700 800 900 1000 10

15

Centigrade

Elapsed Time (s)