-900 -800 -700 -600 -500 -400 -300 -200 -100 0 100

-100

0

100

200

300

400

500

600

Initial UTM Coord North = 4071493.69 East = 603744.9 Dead Reckoning-Blue; GPS-Magenta; Sim-Green Lbl filter-Cyan; Lbl fix-Black ; Data Set: Winfrog

Relative UTM East, Meters

Relative UTM North, Meters