100 200 300 400 500 600 700 800 900

-50

0

50

100

150

Measured Depth and Calculated Bottom: ; Data Set: Winfrog

Depth, Meters

100 200 300 400 500 600 700 800 900 0

50

100

150 Range; PSA - Blue, DVL - Red

Elapsed Time (s)

Range, Meters