0 200 400 600 800 1000 1200 1400 1600 1800 0 100 200 300 400 500 600 700 Backdifference of Time-Stamps: ; Data Set: 2001.123.00

Duration (ms)

Elapsed Time (s)

Control Navigation

0 200 400 600 800 1000 1200 1400 1600 1800 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Duration, Seconds

Elapsed Time (s)

Backdifference of Time-Stamps in Tailcone Log