0 200 400 600 800 1000 1200 1400 1600 1800 28

30

32

34

Volts

Metrabyte Voltage ; Data Set: 2001.123.00 Plotted on 09-May-2001 11:33:40

0 200 400 600 800 1000 1200 1400 1600 1800 0

0.01

0.02

0.03

Amperes

Metrabyte Current ; Data Set: 2001.123.00 Plotted on 09-May-2001 11:33:40

0 200 400 600 800 1000 1200 1400 1600 1800 0 0.2 0.4 0.6 0.8

Watts

Metrabyte Power ; Data Set: 2001.123.00 Plotted on 09-May-2001 11:33:40

Elapsed Time (s)