0 200 400 600 800 1000 1200 1400 1600 1800 0 1000

2000

Northing

Kalman Filter States; Initial UTM Coord North = 4067388.8 East = 600674.2 ; Data Set: 2001.123.00 Plotted on 09-May-2001 11:33:21

0 200 400 600 800 1000 1200 1400 1600 1800

-2000

-1000 0

Easting

0 200 400 600 800 1000 1200 1400 1600 1800 -1 0 1

Depth

0 200 400 600 800 1000 1200 1400 1600 1800 -1 0 1

N Current

0 200 400 600 800 1000 1200 1400 1600 1800 -1 0 1

E Current

0 200 400 600 800 1000 1200 1400 1600 1800 -1 0 1

Spd Bias

0 200 400 600 800 1000 1200 1400 1600 1800 -1 0 1

Hdg Bias

Elapsed Time (s)