0 200 400 600 800 1000 1200 1400 1600 1800 -20 -10 0 10 20

Degrees/Second

X Axis Body Rate (Omega B x), Degrees/Sec ; Data Set: 2001.123.00 09-May-2001 11:33:26 Nav Log Raw Data

0 200 400 600 800 1000 1200 1400 1600 1800 -2 -1 0 1 2 Y Axis Body Rate (Omega B y), Degrees/Sec ; Data Set: 2001.123.00 09-May-2001 11:33:26 Nav Log Raw Data

0 200 400 600 800 1000 1200 1400 1600 1800 -2

0

2

4

Elapsed Time (s)

Z Axis Body Rate (Omega B z), Degrees/Sec ; Data Set: 2001.123.00 09-May-2001 11:33:26 Nav Log Raw Data