200 400 600 800 1000 1200 1400 1600

-20 0 20 40 60 80 100

Measured Depth and Calculated Bottom: ; Data Set: 2001.123.00

Depth, Meters

200 400 600 800 1000 1200 1400 1600 0 20 40 60 80 100 Raw PSA Range

Elapsed Time (s)

Range, Meters