0 500 1000 1500 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Amps

Pump Currents and Temperatures ; Data Set: 2001.123.11 Plotted on 04-May-2001 9:58:8

Anolyte A Anolyte B Catholyte Peroxide

0 500 1000 1500 0 5 10 15 20 25 30 35

Centigrade

Elapsed Time (s)

Anolyte Catholyte Fwd Peroxide Aft Peroxide