250 300 350 400 450 500 32 32.5 33 33.5 34

Volts

Voltages and Currents ; Data Set: 2001.123.17 Plotted on 03-May-2001 18:14:14

Stack Battery Setpoint

380 400 420 440 460 480 500 2 4 6 8 10

Amps

Elapsed Time (s)

Stack Battery

0 50 100 150 200 250 300 350 400 450 500 0

2

4

6

Seconds

Elapsed Time (s)