0 50 100 150 200 250 300 350 -90 -70 -50 -30 -10 10 30 50 70

Wind Speed Map - Based on NRT merged data 2008/12/22 - 2008/12/24

0 1.6 3.2 4.8 6.4 8 9.6 11.2 12.8 14.4 16 17.6 19.2

Speed (m/s)