%---------------------------Edge Ratio-----------------------------
\section{Edge Ratio}

The edge ratio of a quadrilateral is the ratio of its longest and shortest edge lengths:
\[
  q = \frac{L_{\max}}{L_{\min}}.
\]

\quadmetrictable{edge ratio}%
{$1$}%                                      Dimension
{$[1,1.3]$}%                                Acceptable range
{$[1,DBL\_MAX]$}%                           Normal range
{$[1,DBL\_MAX]$}%                           Full range
{$1$}%                                      Square
{\cite{pebay:04}}%                          Citation
{v\_quad\_edge\_ratio}%                     Verdict function name

