0 50 100 150 -80 -60 -40 -20 0 20 40 60 80

y, Centimeters z, Centimeters

T_0 = 3000, T_f = 4350 Sec.

Mean depth error = 0 cm Std of depth error = 11 cm Mean cross-track error = 60 cm Std of cross-track error = 46 cm Radius of CEP = 33 cm

Control Position Error - Data Set: 2005.090.04